(pb) topσ

0 0.2 0.4 0.6 0.8 1 1.2

P> 10 - <log

0.5 1 1.5 2 2.5 3 3.5 4 4.5 5 Scan

T PΣ

H1 -

j - j - j ν e - j - ν - j - μ

1 2 3 4 5 Sensitivity to Anomalous Top Production