0 0.25 0.5 0.75 1 1.25 1.5 1.75 2 2.25 2.5

0 20 40 60 80 100 120 140 160

m (GeV) events

H1^{data SM MC}

GMSB: m(χ^~_1)= 125 GeV

m(χ^{~0})= 125 GeV (arb. norm.)