H1 e^+p

0.08

0.09 0.1

0.2 0.3 0.4 0.5 0.6 0.7 0.8 0.9 1

60 70 80 90 100 110 120 130 m(χ^~_1) (GeV) σ (pb) m(χ^{~0}) (GeV)

GMSB, j=1,2 limit on σ tanβ=2, μΛ0, N=1, M/Λ=2 Δm=10 GeV, λ^,

Δm=10 GeV, λ_{121}=0.5 tanβ=6, μΛ0, N=2, M/Λ=10^3 Δm=10 GeV, λ^,

Δm=10 GeV, λ_{121}=1.0

95% CL