Sample number

Persistent current (units of g_D)

Downstream pipe Downstream pipe reversed Central pipe Central pipe reversed

H1

-0.8

-0.6

-0.4

-0.2 0 0.2 0.4 0.6 0.8

0 2 4 6 8 10 12 14 16 18