0 0.02

0.04

0.06

0.08 0.1

0 50 100 0 0.2 0.4 0.6 0.8 1

0 50 100

0 0.2 0.4 0.6 0.8 1

0 50 100

Model A

Efficiency

North poles South poles g_D 2g_D

3g_D 6g_D

Monopole Mass (GeV) 0 0.2 0.4 0.6 0.8 1

0 50 100