50

100

0.2 0.4 0.6 0.8 1

50

100

0.2 0.4 0.6 0.8 1

Data NLO QCD 0 Had NLO QCD Cascade Pythia

H1 ep 5 ebb^− X 5 ejjμX

x^{obs}_γ dσ/dx^{obs}_γ [pb]

Q^2 Λ 1 GeV^2