10^{-1} 1 10 10^2

10^3

Events

H1 e^+p Ρs_{ep}α300 GeV

NC

Data SM H1 e^+p Ρs_{ep}α300 GeV

CC

10^{-1} 1 10 10^2

10^3

Events

H1 e^−p Ρs_{ep}α320 GeV

H1 e^−p Ρs_{ep}α320 GeV

10^{-1} 1 10 10^2

10^3

Events

100 150 200 250 M (GeV)

H1 e^+p Ρs_{ep}α320 GeV 100 150 200 250 M (GeV)

H1 e^+p Ρs_{ep}α320 GeV