10^{-3}

10^{-2}

10^{-1}

10 10^2 10^3 x = 0.0002 f^{qq} _

H1 Data f^{cc} _ f^{bb} _

10^{-3}

10^{-2}

10^{-1}

10 10^2 10^3 x = 0.0005

MRST04 f^{cc} _ MRST04 f^{bb} _

10^{-2}

10^{-1}

10 10^2 10^3 x = 0.002

10^{-2}

10^{-1}

10 10^2 10^3 x = 0.005

10^{-2}

10^{-1}

10 10^2 10^3 x = 0.013

Q^2 / GeV^2

10^{-2}

10^{-1}

10 10^2 10^3 x = 0.032

Q^2 / GeV^2

H1 Data (High Q^2) f^{cc} _ f^{bb} _