H1 E scale uncert

NLO DISENT 1+δ_{HAD} 0.5μ_{r,f}Λμ_{r,f}Λ2μ_{r,f} PDF uncert.

LO DISENT 1+δ_{HAD}

H1 forward jet data

x_{Bj} dσ / dx_{Bj} (nb) a) 0

500

1000

0.001 0.002 0.003 0.004