)_Z(m_sα

0.10 0.11 0.12 0.13 0.14

=2 GeV)

Iμ(_0α

0.2

0.4

0.6

0.8 0.8_{)+PC Fits2sαNLO(}

H1

stat. and exp. syst. errors

cτ τ

B_0ρ C

to MEAN VALUES