η -0.5 0 0.5 1

[pb] η/dσd

0

500

1000

Data Pythia Cascade had ⊗ NLO QCD ejjX

→Xc ec → ep

η 0

⊗

→ CHARM

η 0

⊗

→ (c)

η 0

⊗

→ H1

η 0

⊗

→

η 0