obs γx 0.2 0.4 0.6 0.8 1

[pb] obs γ /dx σd

210

310

410 DataPythia Pythia res. Cascade had ⊗ NLO QCD ejjX

→Xc ec → ep γ

⊗

→ CHARM

γ

⊗

→ (e)

γ

⊗

→ H1

γ

⊗

→ γ

410