S 0K Entries 150517 Mean 0.496 RMS 0.01969 / ndf

2χ 564 / 93 N 405±

1.319e+05 M 0.0000 ± 0.4959 1 σ 0.000068 ± 0.007319 r 0.0086 ± 0.6256 2 σ 0.00027 ± 0.01911 a 12.7±

318.1 b 24.1±

-275.7

0.45 0.5 0.55 0 2000

4000

6000

8000

10000

12000

0 [GeV] ππM

Entries / 2 MeV

H1 a) H1 data Fit