20 40 60 80

) [pb] +Θ ULσ(^{+Θ}_{UL}σ

2 <10 GeV 2 5<Q

H1

95 % C.L.

20 40 60 p_S^0K p_S^0K

) [pb] +Θ ULσ(^{+Θ}_{UL}σ

0

2 <20 GeV 2 10<Q

1.45 1.5 1.55 1.6 1.65 1.7 0 20 40 60

) [pb] +Θ ULσ(^{+Θ}_{UL}σ

)) [GeV] pp(_S^0 M(K

0

2 <100 GeV 2 20<Q 0