1.025

1.05

1.075 1.1 1.125

1.15

1.175 1.2

10 10^2 10^3

1.025

1.05

1.075 1.1 1.125

1.15

1.175 1.2

10^{-2} 10^{-1}

Q^2 ΜGeV^2Ν α_{IP}(0)

Fit with α_{IP}(t=0,Q^2)

H1 2006 DPDF Fit A (exp. error)

β

Fit with α_{IP}(t=0,β)