0 5 10 15 20 25

10^{-2}

0 0.2 0.4 0.6 0.8 1 1.2

0.4 0.6 0.8 1

10^{-4}

10^{-3}

10^3

x_{IP} dσ/dx_{IP} ΜpbΝ

0.01 0.03 β dσ/dβ ΜpbΝ

Q^2 ΜGeV^2Ν dσ/dQ^2 Μpb/GeV^2Ν

300 1000

H1 Data (Q^2Γ200 GeV^2; yΛ0.9; x_{IP}Λ0.05) H1 2006 DPDF Fit A (IR contrib.)