0.05

0.5

10 10^2

Q^2 ΜGeV^2Ν

3^i * x_{IP} σ_r^{D(3)} / σ_r

x=5E-05 β=0.17 (i=3)

x_{IP} = 0.0003

x=8E-05 β=0.27 (i=2)

x=0.00013 β=0.43 (i=1)

x=0.0002 β=0.67 (i=0)

H1 Data Fit (a_R + b_R ln Q^2)