) [GeV] π ) - m(K sππ m(K 0.14 0.145 0.15 0.155 0.16 0.165

Combinations per 0.5 MeV

0 50 100 150 200 250 300 350 400

Data fit 57 ± N(D*) = 592 ± p: D*+other Jet γ

± γ H1

± γ