[nb/GeV] pγ /dW σd

0 0.05 0.1 0.15 0.2 0.25

p: inclusive D* γ H1^{DataCascade 1.2}_{Pythia 6.2} γ H1

[GeV] pγW 180 200 220 240

R

0.8 1 1.2 1.4

Data Cascade 1.2 Pythia 6.2