β -2 10^{-1}10

D ccf

0

0.1

0.2

0.3

0.4

0.5

2 = 35 GeV 2Q = 0.004 IPx

H1 Displaced Track Data Data * H1 D H1 2006 DPDF Fit A H1 2006 DPDF Fit B

β

D

0