) [ GeV ] π ) - M(K

slow ππ M(K

0.135 0.14 0.145 0.15 0.155 0.16 0.165

track combinations / MeV

0

20

40

60

80

100

15 ± N(D*) = 124

H1 99-00 Fit

π 0