0.5 1 1.5 2

10 -3 10 -2 10 -1

1

2

10 -3 10 -2 10 -1

1

2

10 -3 10 -2 10 -1

0.5 1 1.5 2

10 -3 10 -2 10 -1

HVQDIS CTEQ5F3 MRST2004F3

R_{norm}