-210^{-1}10 1

-210

-110

1 1

200 GeV

1

250 GeV

1

280 GeV

1 350 GeV 1 1 1 1

=0.01 LFVβ

=0.10

LFVβ

=0.50

LFVβ

=0.90

LFVβ

=0.99

LFVβ

1eqλ

1qτλ

H1 u) F=2

- (e^L_0S