px 0 0.2 0.4 0.6 0.8 1

p /dx 1/N dn

-210

-110 1 10 210 310 410 510 610 710 810

<Q> = 12.3 GeV

<Q> = 14.5 GeV

<Q> = 18.0 GeV

<Q> = 25.0 GeV

<Q> = 36.0 GeV

<Q> = 58.2 GeV

<Q> = 102 GeV

a)

PS H1 Data

Q, E* (GeV)

10^210

p /dx 1/N dn

-210

-110

1

10

210

310

410 H1 Data

-e^+e PS range px

b)

0.0 - 0.02 (x30)

0.02 - 0.05 (x5)

0.05 - 0.1 (x2)

0.1 - 0.2

0.2 - 0.3 0.3 - 0.4 0.4 - 0.5

0.5 - 0.7

0.7 - 1.0