x_{IP} =0.001

10^{-2}

10^{-1}

1

10

10^2

10^3

10 10^2 10^3 Q^2 ΜGeV^2Ν

3^i⋅x_{IP}σ_r^{D(3)}

β=0.8, i=0 β=0.5, i=1 β=0.32, i=2 β=0.2, i=3 β=0.13, i=4

H1 data H1 2007 Jets DPDF H1 2006 DPDF Fit A H1 2006 DPDF Fit B