10^{-2}

10^{-1}

1

10

10 10^2

-0.1

-0.3

-0.5

-0.8 t ΜGeV^2Ν

Dipole model

H1 HERA II e^-p

H1

10^{-2}

10^{-1}

1

10

10 10^2 τ dσ_{DVCS}/dt Μnb/GeV^2Ν