f’ / f

-6 -4 -2 0 2 4 6

]^{-1} [GeV Λ f /

-3 10

-2 10

-1 10

* mass ν

110 GeV

160 GeV

190 GeV

210 GeV

230 GeV

250 GeV

280 GeV

)^{-1} p, 184 pb - * at HERA (e ν Search for H1