0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 x = 0.00049

x = 0.00049

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 x = 0.00062

x = 0.00062

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 x = 0.00076

x = 0.00076

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 x = 0.0010

x = 0.0010

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 x = 0.0016

x = 0.0016

0 0.2 0.4 0.6 0.8 1 1.2 1.4 1.6 x = 0.0025

x = 0.0025

H1

H1 Data

2 = 25 GeV 2Q

= 920 GeV pE = 575 GeV pE = 460 GeV pE Linear fit

, y) 2 (x, Q rσ

+ / Y 2y

1

1.2

1.4

1.6

1

1.2

1.4

1.6

0 0.2 0.4 0.6 0.8 0 0.2 0.4 0.6 0.8 0 0.2 0.4 0.6 0.8