jet /dz σ dσ1/

0.5 1 1.5 2 2.5 3 3.5 4 H1 Data W <170 GeV RAPGAP W <170 GeV H1 Data W >170 GeV RAPGAP W >170 GeV

jet sample ±D*

jetz

0.2 0.4 0.6 0.8 1

R

0.5 1 1.5