0 0.2 0.4 0.6 0.8 1

10 15 20 25 r_{sp}/ cm ε_{BST}

H1 data MC a) 0.9

0.95

1

1.05

1.1

10 15 20 25 r_{sp}/ cm ε_{data}/ε_{MC} b)

Mean = 1.003 Α 0.002