m_{ππ} ΜGeVΝ arbitrary units

H1 Data PYTHIA 6.2 with BEC PYTHIA 6.2 without BEC H1

0

0.02

0.04

0.06

0.08

0.5 0.6 0.7 0.8 0.9 1