q* Mass [GeV]

50 100 150 200 250 300 350

Events

-2 10

-1 10

1

10

1

SM q* signal M=240 GeV

H1 Data

)^{-1}

Search for q* at HERA (475 pb

ν q e→ q W →*q H1