q* Mass [GeV]

100 120 140 160 180 200 220 240 260

f

-1 10

1

f

1

f

1 )^{-1}

Search for q* at HERA (475 pb = M f = f’

Λ q*

H1 = 0.01 s H1, f

= 0.1 s H1, f

CDF = 0.1 sf