1

10

10^2

10^3

100 200

W [GeV] σ_{γ∗p 5 ρY} ΜnbΝ

50 b) γ∗ p 5 ρ Y Q^2 [GeV^2] H1 3.3 7.5

22.5

H1_{fit ∝ W}δ