H1 F^b_2^b _ (x,Q^2)

10^{-2}

10^{-1}

1

10

10 10^2 10^3

x=0.0002 i=5 x=0.0005 i=4 x=0.0013 i=3 x=0.005 i=2

x=0.013 i=1

x=0.032 i=0

H1

Q^2 / GeV^2

F^b_2^b _ Ξ 6^i

H1 Data MSTW08 NNLO MSTW08 CTEQ6.6