Transverse Radius [cm]

2 4 6

Events

0 1000

2000

3000

4000

0

4000 H1

Transverse Symmetry

0.5 1

Events

0

1000

2000

3000

0

3000 H1

Transverse Kurtosis

0 5 10 15

Events

0 1000

2000

3000

4000

0

4000 H1

First Layer Fraction

0 0.2 0.4 0.6

Events

0

1000

2000

3000

0

3000 H1

Hot Core Fraction

0.4 0.6 0.8 1

Events

0 2000

4000

6000

0

H1

Hottest Cell Fraction

0 0.5 1

Events

0

1000

2000

3000

0

3000 H1

H1 Data Sum Signal Background