0

5

10

15

20

-410^{-3}10^{-2}10^{-1}10 1 0

5

)=0.1176) Z (M_sα

HERAPDF1.0 ( total uncertainty )=0.1156 Z (M_sα

)=0.1196 Z (M_sα

x xg

2 = 10 GeV 2Q H1 and ZEUS

xg

0

5

H1 and ZEUS