0 0.2 0.4 0.6

10^{-3} 10^{-2} β

Q^2 = 7.3 GeV^2

0 0.2 0.4 0.6

10^{-3} 10^{-2} β

Q^2 = 11 GeV^2

0 0.2 0.4 0.6

10^{-2} β

Q^2 = 16 GeV^2

0 0.2 0.4 0.6

10^{-2} β

Q^2 = 24 GeV^2

0 0.2 0.4 0.6

10^{-2} β

Q^2 = 37 GeV^2

0 0.2 0.4 0.6

10^{-2} 10^{-1} β

Q^2 = 55 GeV^2

0 0.2 0.4 0.6

10^{-1} β

Q^2 = 82 GeV^2 H1 Data

GRSc-π LO

ABFKW-π Set 1 NLO

2/3 F_2 H1PDF2009

DJANGOΞ1.2/Γ_π

F^{LN(3)}_2(x_L= 0.73)/Γ_π , Γ_π = 0.13 H1