H1 data data correlated uncertainty

no MI

Rapgap / Pythia_{MI} Rapgap / Pythia

γ^{jets} x 0.2 0.4 0.6 0.8 1 incl

σ /

diff σ

0.01

0.02

0.03

0.04

x σ

(a) H1

[GeV]

jet1 TE 6 8 10 12 14 incl

σ /

diff σ

0.01

0.02

0.03

σ

(b)

〉 jets η〈 -0.5 0 0.5 incl

σ /

diff σ

0.02

0.04

0.06

〉 σ

(c)

jetsηΔ 0 0.5 1 1.5 2 incl

σ /

diff σ

0.01

0.02

0.03

σ

(d)

[GeV] 12M 10 15 20 25 incl

σ /

diff σ

0.01

0.02

0.03

σ

(e)

W [GeV]

180 200 220 240 incl

σ /

diff σ

0.01

0.02

0.03

σ

(f)