[GeV]

squark M 100 150 200 250

-2 10

-1 10

1

113 ’λ

(CCU) 113 ’λ

Unconstrained MSSM

-1 H1 13.5 pb

H1

Excluded at 95% CL

Excluded in part of parameter space

-1 p 183pb -e

= 6 β tan < 300 GeV μ -300 < < 350 GeV 2 70 < M = 90 GeV

slepton M > 30 GeV LSP M