0.8

1

1.2

0.5 1 x=0.00012

Q^2=6.5 GeV^2 σ_r

0.8

1

1.2

0.5 1 x=0.00014

0.8

1

1.2

0.5 1 x=0.00015

H1 Collaboration

0.8

1

1.2

0 0.5 1 x=0.00017

0.8

1

1.2

0.5 1 x=0.00020

0.8

1

1.2

0.5 1 x=0.00026

y^2/(1+(1-y)^2)

E_p=920 GeV E_p=575 GeV E_p=460 GeV Linear fit