]^2

[GeV 2Q 10^210

i ) x 2 2 (x,Q cc 2F

-3 10

-2 10

-1 10

1

10

210

H1 D* H1 VTX

HVQDIS (CT10f3) HVQDIS (MSTW2008f3) HERAPDF1.0 exp model param

x = 0.00013, i=10

x = 0.00020, i=9 x = 0.00032, i=8 x = 0.0005, i=7 x = 0.0008, i=6 x = 0.0013, i=5

x = 0.0020, i=4

x = 0.0032, i=3

x = 0.0050, i=2

x = 0.0080, i=1

x = 0.0200, i=0

H1