(D*) η -1.5 -1 -0.5 0 0.5 1 1.5

[nb/GeV] T dp η / d σ^2d

0 0.5 1 1.5 2

η

T η

0

1

2 (D*) < 2.00 GeV T 1.25 < p

[nb/GeV] T dp η / d σ^2d

(D*) η -1.5 -1 -0.5 0 0.5 1 1.5

[nb/GeV] T dp η / d σ^2d

0 0.5 1 1.5

η

T η

0

1 1.5 (D*) < 2.75 GeV T 2.00 < p

(D*) η -1.5 -1 -0.5 0 0.5 1 1.5

[nb/GeV] T dp η / d σ^2d

0 0.2 0.4 0.6

η

T η

0

0.6 (D*) < 4.00 GeV T 2.75 < p

(D*) η -1.5 -1 -0.5 0 0.5 1 1.5

[nb/GeV] T dp η / d σ^2d

0 0.1 0.2 0.3

η

T η

0

0.3 (D*) < 6.00 GeV T 4.00 < p

(D*) η -1.5 -1 -0.5 0 0.5 1 1.5

[nb/GeV] T dp η / d σ^2d

0 0.005

0.01

0.015

η

T η

0

0.015 (D*) < 20.00 GeV T 6.00 < p

H1 data RAPGAP (CTEQ66M) RAPGAP (CTEQ6ll) CASCADE (A0)

D* in DIS