x -4 10×2^{-3}10^{-3}10×2 -10

0

10

20

2 = 11.5 GeV

2Q^2

= 44 GeV 2Q

H1 Collaboration R DR_{H1 data = 0.003} IPx = 0.0005 IPx

R(H1 2009)

(Fit B) DR