+ / Y 2y

)^2 , Q β, _{IP} (x^D_rσ _{IP}x

H1 data

=920 GeV pE =820 GeV pE =575 GeV pE =460 GeV pE linear fit H1 2006 DPDF Fit B extrapolated Fit B

0 0.2 0.4 0.6 0.8 1 0

0.02

0.04 2 = 4 GeV 2Q = 0.0005 IPx = 0.227 β

0 0.2 0.4 0.6 0.8 1 0

0.05

0.1 2 = 11.5 GeV 2Q = 0.0005 IPx = 0.570 β

0 0.2 0.4 0.6 0.8 1 0

0.05

0.1 2 = 11.5 GeV 2Q = 0.0005 IPx = 0.699 β

0 0.2 0.4 0.6 0.8 1 0

0.01

0.02

0.03 2 = 4 GeV 2Q = 0.003 IPx = 0.033 β

0 0.2 0.4 0.6 0.8 1 0

0.01

0.02

0.03 2 = 4 GeV 2Q = 0.003 IPx = 0.041 β

0 0.2 0.4 0.6 0.8 1 0

0.01

0.02

0.03 2 = 4 GeV 2Q = 0.003 IPx = 0.054 β

0 0.2 0.4 0.6 0.8 1 0

0.02

0.04 2 = 11.5 GeV 2 Q = 0.003 IPx = 0.089 β

0 0.2 0.4 0.6 0.8 1 0

0.02

0.04 2 = 11.5 GeV 2 Q = 0.003 IPx = 0.101 β

0 0.2 0.4 0.6 0.8 1 0

0.02

0.04 2 = 11.5 GeV 2 Q = 0.003 IPx = 0.117 β

0 0.2 0.4 0.6 0.8 1 0

0.02

0.04 2 = 11.5 GeV 2 Q = 0.003 IPx = 0.155 β

0 0.2 0.4 0.6 0.8 1 0

0.02

0.04

0.06 2

= 44 GeV 2Q = 0.003 IPx = 0.341 β

0 0.2 0.4 0.6 0.8 1 0

0.02

0.04

0.06 2

= 44 GeV 2Q = 0.003 IPx = 0.386 β

0 0.2 0.4 0.6 0.8 1 0

0.02

0.04

0.06 2

= 44 GeV 2Q = 0.003 IPx = 0.446 β

0 0.2 0.4 0.6 0.8 1 0

0.02

0.04

0.06 2

= 44 GeV 2Q = 0.003 IPx = 0.592 β

0.0 0.2 0.4 0.6 0.8 0.0 0.2 0.4 0.6 0.8 0.0 0.2 0.4 0.6 0.8 0.0 0.2 0.4 0.6 0.8 1.0

0.00

0.02

0.04

0.06

0.00

0.02

0.04

0.00

0.01

0.02

0.00

0.05

0.00

0.02

0.04 H1