β -1 10 1

-0.04

-0.02 0 0.02

0.04

0.06

⇓

H1 Collaboration

IP/pf

D LF

H1 data_2 = 4 GeV 2 = 0.0005, Q

IPx_2 = 11.5 GeV 2 = 0.0005, Q

IPx_2 = 4 GeV 2 = 0.003, Q

IPx_2 = 11.5 GeV 2 = 0.003, Q

IPx_2 = 44 GeV 2 = 0.003, Q IPx

H1 2006 DPDF Fit B extrapolated Fit B

95% CL upper limit