20

40

60

80

100

0 1 2 3

dσ/dΔϕ(pb/rad)

2.0 ≤ Y Λ 3.4 Λ x Γ = 0.0024

H1 data

Energy scale uncert. NLOJET++ 0.5 μ_{r,f} Λ μ_{r,f} Λ 2 μ_{r,f}

0.02

0.04

0.06

0.08

0.1

1 2 3

3.4 ≤ Y Λ 4.25 Λ x Γ = 0.0012

forward jet

0.02

0.04

0.06

0.08

0.1

1 2 3

4.25 ≤ Y Λ 5.75 Λ x Γ = 0.00048

Δϕ(rad)