γx 0 0.2 0.4 0.6 0.8 1

[nb] γ /dx σd

0

10

20

30 Data MC@NLO H1 γ

0 γ

0

γx 0 0.2 0.4 0.6 0.8 1 norm R

0.5 1 1.5

R

1

R

1