1.06

1.08

1.1

1.12

1.14

1.16

1.18

1.2

10 10^2

Q^2 ΜGeV^2Ν α_{IP}(0)

H1

H1 LRG (M_YΛ1.6 GeV) (exp.+model) H1 LRG 1997 (M_YΛ1.6 GeV) (exp.+model) H1 FPS HERA-II (exp.+model) ZEUS LRG+LPS (exp.+model)