β rσ _{IP}x^{D(3)}

=0.0003 IPx 2 =3.5 GeV

2Q^2

=5.0 GeV

2Q^2

=6.5 GeV

2Q^2

=8.5 GeV 2Q

2 =12 GeV 2Q

-1 10 1

-1 10 1^{-1}10 1^{-1}10 1

0

0.05

0

0.05

< 1.6 GeV) Y H1 LRG (M < 1.6 GeV) Y H1 LRG 1997 (M

H1 2006 DPDF Fit B (extrapol. fit)

H1